--
-- PostgreSQL database dump
--

-- Dumped from database version 9.5.8
-- Dumped by pg_dump version 9.5.8

SET statement_timeout = 0;
SET lock_timeout = 0;
SET client_encoding = 'UTF8';
SET standard_conforming_strings = on;
SET check_function_bodies = false;
SET client_min_messages = warning;
SET row_security = off;

SET search_path = awips, pg_catalog;

--
-- Data for Name: parameter; Type: TABLE DATA; Schema: awips; Owner: awipsadmin
--

INSERT INTO parameter (abbreviation, name, unit) VALUES ('SCP', 'Snow Cover', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('Vis', 'Visibility', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PR', 'Precipitation Rate', 'mm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN10pct12hr', '12hr 10th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ULWRF', 'Upward Long-Wave Rad. Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ICETK', 'Ice Thickness', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PW', 'Precipitable Water', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN1in12hr', '12hr Prob of Total snowfall > 1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CP12hr', 'Convective Precipitation(12 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CWORK', 'Cloud Work Function', 'J/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MXSALB', 'Maximum Snow Albedo', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LgSP1hr', 'Large Scale Precipitation(1 hour)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CDUVB', 'Clear sky UV-B Downward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR1in72hr', '72hr Prob of Freezing Rain > 1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LAPR', 'Lapse Rate', 'K/m') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PoT', 'Potential Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VFLX', 'Momentum Flux, V-Component', 'N/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LCDC', 'Low Cloud Cover', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TSOIL', 'Soil Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SBSNO', 'Sublimation (evaporation from snow)', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CFRZR', 'Categorical Freezing Rain', 'bit') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TPFI', 'Turbulence Potential Forecast Index', '') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CPOFP', 'Percent of Frozen Precipitation', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN90pct72hr', '72hr 90th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN2in48hr', '48hr Prob of Total snowfall > 2in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR10pct72hr', '72hr 10th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ICMR', 'Ice Water Mixing Ratio', '') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN90pct12hr', '12hr 90th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT6.9V', 'Brightness Temperature (6.9GHz,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN10pct24hr', '24hr 10th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MAXRH', 'Maximum Relative Humidity', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SFCR', 'Surface Roughness', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN1in24hr', '24hr Prob of Total snowfall > 1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN25pct72hr', '72hr 25th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN5pct48hr', '48hr 5th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RIME', 'Rime Factor', 'non-dim') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CCOND', 'Canopy Conductance', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.25in24hr', '24hr Prob of Freezing Rain > 0.25in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WEASD', 'Water Equivalent of Accumulated Snow Depth', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRICV', 'Frictional Velocity', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('AV', 'Absolute Vorticity', '/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RH', 'Relative Humidity', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP18hr', 'Total Precipitation(18 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('OZMAX8', 'Ozone Daily Max from 8-hour Average', 'ppbV') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DSWRF', 'Downward Short-Wave Radiation Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SOTYP', 'Soil Type', '') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP1hr', 'Total Precipitation(1 hour)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ThP', 'Thunderstorm Probability', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('OZMAX1', 'Ozone Daily Max from 1-hour Average', 'ppbV') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VILIQ', 'Vertically Integrated Liquid (VIL)', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR50pct48hr', '48hr 50th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RCQ', 'Humidity parameter in canopy conductance', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SNFALB', 'Snow-Free Albedo', '') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN2in24hr', '24hr Prob of Total snowfall > 2in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RCS', 'Solar parameter in canopy conductance', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SMDRY', 'Direct Evaporation Cease (soil moisture)', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP3hr', 'Total Precipitation(3 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR90pct72hr', '72hr 90th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PPI', 'Precipitation Probability Index', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SWHR', 'Solar Radiative Heating Rate', 'K/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN18in72hr', '72hr Prob of Total snowfall > 18in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('NDDSF', 'Near IR Diffuse Downward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LHF', 'Latent Heat Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PEVPR', 'Potential Evaporation Rate', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('O3MR', 'Ozone Mixing Ratio', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TRANS', 'Transpiration', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('P', 'Pressure', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SVV', 'Sigma Coordinate Vertical Velocity', '1/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('T', 'Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SH', 'Specific Humidity', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('NLAT', 'Latitude (-90 to 90)', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VUCSH', 'Vertical u-component shear', '1/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCLSW', 'Total Column Integrated Supercooled Liquid Water', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN10pct48hr', '48hr 10th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CD', 'Drag Coefficient', 'Numeric') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT6.9H', 'Brightness Temperature (6.9GHz,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.25in48hr', '48hr Prob of Freezing Rain > 0.25in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('QMIN', 'Minimum specific humidity at 2m', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN2in12hr', '12hr Prob of Total snowfall > 2in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR95pct48hr', '48hr 95th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN75pct72hr', '72hr 75th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT18.7V', 'Brightness Temperature (18.7GHz,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('HI', 'Haines Index', 'Numeric') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CP', 'Convective Precipitation', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('Perranl', 'Pressure Error Analysis', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DSLM', 'Deviation Of Sea Level from Mean', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DIRSW', 'Secondary Wave Direction', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SALTY', 'Salinity', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCCerranl', 'Total Cloud Cover Error Analysis', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PEVAP', 'Potential Evaporation', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT18.7H', 'Brightness Temperature (18.7GHz,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN95pct48hr', '48hr 95th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('STRM', 'Stream Function', 'm^2/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP', 'Total Precipitation', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT36.5V', 'Brightness Temperature (36.5GHz,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR50pct24hr', '24hr 50th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('uW', 'U-Component of Wind', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR1in48hr', '48hr Prob of Freezing Rain > 1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN8in12hr', '12hr Prob of Total snowfall > 8in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RETOP', 'Echo Top', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT89.0BV', 'Brightness Temperature (89.0GHz-B,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RWMR', 'Rain Mixing Ratio', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN5pct12hr', '12hr 5th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('Ta', 'Temperature Anomaly', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WMIXE', 'Wind Mixing Energy', 'J') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SHF', 'Sensible Heat Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.25in72hr', '72hr Prob of Freezing Rain > 0.25in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DpTerranl', 'Dew Point Temperature Error Analysis', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN12in72hr', '72hr Prob of Total snowfall > 12in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR25pct72hr', '72hr 25th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LgSP3hr', 'Large Scale Precipitation(3 hour)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT36.5H', 'Brightness Temperature (36.5GHz,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('HCDC', 'High Cloud Cover', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PRESA', 'Pressure Anomaly', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP24hr', 'Total Precipitation(24 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LSOIL', 'Liquid soil moisture content (non-frozen)', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('vW', 'V-Component of Wind', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DLWRF', 'Downward Long-Wave Rad. Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN12in12hr', '12hr Prob of Total snowfall > 12in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CP9hr', 'Convective Precipitation(9 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SWPER', 'Mean Period of Swell Waves', 's') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN8in24hr', '24hr Prob of Total snowfall > 8in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN2in72hr', '72hr Prob of Total snowfall > 2in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PERSW', 'Secondary Wave Mean Period', 's') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT89.0AV', 'Brightness Temperature (89.0GHz-A,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TKE', 'Turbulent Kinetic Energy', 'J/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CDCON', 'Convective Cloud Cover', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MCDC', 'Medium Cloud Cover', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MnT', 'Minimum Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP12hr', 'Total Precipitation(12 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SSRUN', 'Storm Surface Runoff', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.01in24hr', '24hr Prob of Freezing Rain > 0.01in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN95pct24hr', '24hr 95th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('GFLUX', 'Ground Heat Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ETCWL', 'Extra Tropical Storm Surge Combined Surge and Tide', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT89.0BH', 'Brightness Temperature (89.0GHz-B,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN90pct48hr', '48hr 90th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CP1hr', 'Convective Precipitation(1 hour)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MAXUW', 'U Component of Hourly Maximum Wind Speed', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('Viserranl', 'Visibility Error Analysis', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN12in24hr', '24hr Prob of Total snowfall > 12in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR25pct24hr', '24hr 25th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('EVCW', 'Canopy water evaporation', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VGTYP', 'Vegetation Type', 'Integer (0-13)') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CIn', 'Convective Inhibition', 'J/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VTMP', 'Virtual Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CAPE', 'Convective Available Potential Energy', 'J/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WD', 'Wind Direction (from which blowing)', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN10pct72hr', '72hr 10th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ICSEV', 'Icing severity', 'non-dim') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.25in12hr', '12hr Prob of Freezing Rain > 0.25in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR75pct48hr', '48hr 75th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DIRPW', 'Primary Wave Direction', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VRATE', 'Ventilation Rate', 'm2 1/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FLDCP', 'Field Capacity', 'Fraction') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN6in12hr', '12hr Prob of Total snowfall > 6in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN95pct12hr', '12hr 95th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VPT', 'Virtual Potential Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR1in12hr', '12hr Prob of Freezing Rain > 1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP48hr', 'Total Precipitation(48 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WS', 'Wind Speed', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DUVB', 'UV-B Downward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT89.0AH', 'Brightness Temperature (89.0GHz-A,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WATR', 'Water Runoff', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('GH', 'Geopotential Height', 'gpm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR25pct12hr', '12hr 25th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('EVBS', 'Direct Evaporation from Bare Soil', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR50pct12hr', '12hr 50th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WDerranl', 'Wind Direction Error Analysis', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN8in48hr', '48hr Prob of Total snowfall > 8in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ELON', 'East Longitude (0 to 360)', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN5pct24hr', '24hr 5th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN4in72hr', '72hr Prob of Total snowfall > 4in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CSDSF', 'Clear Sky Downward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN6in24hr', '24hr Prob of Total snowfall > 6in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WDEPTH', 'Geometric Depth Below Sea Surface', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('UPHL', 'Updraft Helicity', 'm^2/s^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RSMIN', 'Minimal Stomatal Resistance', 's/m') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR1in24hr', '24hr Prob of Freezing Rain > 1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN90pct24hr', '24hr 90th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VWSH', 'Vertical Speed Shear', '/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN12in48hr', '48hr Prob of Total snowfall > 12in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR25pct48hr', '48hr 25th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP6hr', 'Total Precipitation(6 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN75pct48hr', '48hr 75th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WVHGT', 'Significant Height of Wind Waves', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TSRWE', 'Total Snowfall Rate Water Equivalent', 'kg/m^2 1/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('EPT', 'Equivalent Potential Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN4in24hr', '24hr Prob of Total snowfall > 4in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('NBDSF', 'Near IR Beam Downward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('GeH', 'Geometric Height', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.5in72hr', '72hr Prob of Freezing Rain > 0.5in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SOILW', 'Volumetric Soil Moisture Content', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR5pct24hr', '24hr 5th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN95pct72hr', '72hr 95th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SLI', 'Surface Lifted Index', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PVV', 'Vertical Velocity Pressure', 'Pa/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TSNOW', 'Total Snow', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('OZCON', 'Ozone Concentration', 'ppb') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BMIXL', 'Blackadar''s Mixing Length Scale', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR75pct24hr', '24hr 75th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SATD', 'Saturation Deficit', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SOILM', 'Soil Moisture Content', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DpD', 'Dew Point Depression', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CEIL', 'Ceiling', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SWELL', 'Significant Height of Swell Waves', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LgSP', 'Large Scale Precipitation', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PPI1hr', 'Precipitation Probability Index(1 hour)', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('U-GWD', 'Zonal Flux of Gravity Wave Stress', 'N/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN18in48hr', '48hr Prob of Total snowfall > 18in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CP3hr', 'Convective Precipitation(3 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('EMSP', 'MSLP (ETA Reduction)', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN4in12hr', '12hr Prob of Total snowfall > 4in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR5pct12hr', '12hr 5th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SnD', 'Snow Depth', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DpT', 'Dew Point Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.01in12hr', '12hr Prob of Freezing Rain > 0.01in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.5in12hr', '12hr Prob of Freezing Rain > 0.5in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CSUSF', 'Clear Sky Upward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SWDIR', 'Direction of Swell Waves', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PMSL', 'Pressure Reduced to MSL', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.1in48hr', '48hr Prob of Freezing Rain > 0.1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR90pct48hr', '48hr 90th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR50pct72hr', '72hr 50th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WSerranl', 'Wind Speed Error Analysis', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR75pct12hr', '12hr 75th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN50pct72hr', '72hr 50th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RCSOL', 'Soil moisture parameter in canopy conductance', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT23.8H', 'Brightness Temperature (23.8GHz,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PERPW', 'Primary Wave Mean Period', 's') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR75pct72hr', '72hr 75th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SBT124', 'Simulated Brightness Temperature for GOES 12, Channel 4', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('GVV', 'Geometric Vertical Velocity', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SBT123', 'Simulated Brightness Temperature for GOES 12, Channel 3', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('RLYRS', 'Number of Soil Layers in Root Zone', 'Numeric') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN4in48hr', '48hr Prob of Total snowfall > 4in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR5pct48hr', '48hr 5th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ETSRG', 'Extra Tropical Storm Surge', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.5in24hr', '24hr Prob of Freezing Rain > 0.5in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WVPER', 'Mean Period of Wind Waves', 's') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN5pct72hr', '72hr 5th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ACOND', 'Aerodynamic conductance', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT23.8V', 'Brightness Temperature (23.8GHz,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('DIRC', 'Surface Current Direction', 'degree') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CICE', 'Cloud Ice', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN30in72hr', '72hr Prob of Total snowfall > 30in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN8in72hr', '72hr Prob of Total snowfall > 8in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MCONV', 'Horizontal Moisture Convergence', 'kg/kg*s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN25pct48hr', '48hr 25th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('KI', 'K Index', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MAXVW', 'V Component of Hourly Maximum Wind Speed', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SNOM', 'Snow Melt', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MSG', 'Montgomery Stream Function', 'm^2/s^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LTNG', 'Lightning', 'non-dim') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SBT114', 'Simulated Brightness Temperature for GOES 11, Channel 4', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SBT113', 'Simulated Brightness Temperature for GOES 11, Channel 3', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SNMR', 'Snow Mixing Ratio', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT10.7V', 'Brightness Temperature (10.7GHz,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SMREF', 'Transpiration Stress-onset (soil moisture)', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BRTMP', 'Brightness Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR10pct48hr', '48hr 10th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('HPBL', 'Planetary Boundary Layer Height', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('HIdx', 'Heat Index', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT10.7H', 'Brightness Temperature (10.7GHz,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('QMAX', 'Maximum specific humidity at 2m', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN24in72hr', '72hr Prob of Total snowfall > 24in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('Heli', 'Storm Relative Helicity', 'm^2/s^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WGH', '5-Wave Geopotential Height', 'gpm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VEG', 'Vegetation', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FROZR', 'Frozen Rain', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CRAIN', 'Categorical Rain', 'bit') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WGS', 'Wind Gust Speed', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLI', 'Total Column-Integrated Cloud Ice', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PVORT', 'Potential Vorticity', 'm^2*kg^-1*1/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLG', 'Total Column Integrated Graupel', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN18in12hr', '12hr Prob of Total snowfall > 18in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SPC', 'Surface Current Speed', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT7.3H', 'Brightness Temperature (7.3GHz,H)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLC', 'Total Column-Integrated Condensate', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR95pct12hr', '12hr 95th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('V-GWD', 'Meridional Flux of Gravity Wave Stress', 'N/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LANDN', 'Land-sea coverage (nearest neighbor) [land=1,sea=0]', '') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR90pct12hr', '12hr 90th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CSNOW', 'Categorical Snow', 'bit') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN25pct24hr', '24hr 25th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.5in48hr', '48hr Prob of Freezing Rain > 0.5in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ICAHT', 'ICAO Standard Atmosphere Reference Height', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CSDLF', 'Clear Sky Downward Long Wave Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.1in72hr', '72hr Prob of Freezing Rain > 0.1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN75pct12hr', '12hr 75th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR95pct24hr', '24hr 95th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CPRAT', 'Convective Precipitation Rate', 'mm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN50pct48hr', '48hr 50th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('USTM', 'U-Component of Storm Motion', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VBDSF', 'Visible Beam Downward Solar Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MIXR', 'Humidity Mixing Ratio', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WGSerranl', 'Wind Gust Speed Error Analysis', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCC', 'Total Cloud Cover', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BT7.3V', 'Brightness Temperature (7.3GHz,V)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR10pct24hr', '24hr 10th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MINRH', 'Minimum Relative Humidity', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CWAT', 'Cloud Water', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ELEV', 'Ocean Surface Elevation Relative to Geoid', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('USWRF', 'Upward Short-Wave Radiation Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('EVP', 'Evaporation', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN75pct24hr', '24hr 75th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CUEFI', 'Convective Cloud Efficiency', 'non-dim') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TP9hr', 'Total Precipitation(9 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VAPP', 'Vapor Pressure', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SUNSD', 'Sunshine Duration', 's') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('BGRUN', 'Baseflow-Groundwater Runoff', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SLTYP', 'Surface Slope Type', 'Index') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CSULF', 'Clear Sky Upward Long Wave Flux', 'W/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LAND', 'Land Cover (0=sea, 1=land)', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOND', 'Total Condensate', 'kg/kg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PLI', 'Parcel Lifted Index (to 500 mb)', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR95pct72hr', '72hr 95th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('Terranl', 'Temperature Error Analysis', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN50pct24hr', '24hr 50th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SALIN', 'Practical Salinity', 'PSU') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PBLREG', 'Planetary Boundary Layer Regime', '') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR10pct12hr', '12hr 10th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MMSP', 'MSLP (MAPS Reduction)', 'Pa') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CICEP', 'Categorical Ice Pellets', 'bit') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('PPI6hr', 'Precipitation Probability Index(6 hour)', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('POROS', 'Soil Porosity', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WVDIR', 'Direction of Wind Waves', 'deg') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VSTM', 'V-Component of Storm Motion', 'm/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('SNOWLVL', 'Snow Level', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN24in48hr', '48hr Prob of Total snowfall > 24in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN18in24hr', '24hr Prob of Total snowfall > 18in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR5pct72hr', '72hr 5th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CP6hr', 'Convective Precipitation(6 hours)', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('MxT', 'Maximum Temperature', 'K') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.1in12hr', '12hr Prob of Freezing Rain > 0.1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('CPOZP', 'Probability of Freezing Precip', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN25pct12hr', '12hr 25th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN50pct12hr', '12hr 50th percentile Total snowfall', 'm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR90pct24hr', '24hr 90th percentile Freezing Rain', 'mm') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOZNE', 'Total Ozone', 'DU') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('WILT', 'Wilting Point', 'Proportion') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLW', 'Total Column-Integrated Cloud Water', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('ALBDO', 'Albedo', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('FRZR0.1in24hr', '24hr Prob of Freezing Rain > 0.1in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('LWHR', 'Long-Wave Radiative Heating Rate', 'K/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLS', 'Total Column Integrated Snow', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLR', 'Total Column Integrated Rain', 'kg/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TOTSN30in48hr', '48hr Prob of Total snowfall > 30in', '%') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('UFLX', 'Momentum Flux, U-Component', 'N/m^2') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('VVCSH', 'Vertical v-component shear', '1/s') ON CONFLICT DO NOTHING;
INSERT INTO parameter (abbreviation, name, unit) VALUES ('TCOLM', 'Total Column Integrated Melting Ice', 'kg/m^2') ON CONFLICT DO NOTHING;


--
-- PostgreSQL database dump complete
--

